<template>
  <view class="user-center-page">
    <!-- 顶部用户信息栏 -->
    <view class="user-info-header">
      <!-- 渐变背景层 -->
      <view class="header-bg"></view>
      <!-- 用户信息主体 -->
      <view class="user-info-wrap">
        <!-- 头像 -->
        <up-avatar
            :src="userStore.isLogin ? userInfo.avatar : '/static/imgs/default-avatar.png'"
            size="100rpx"
            shape="circle"
            class="user-avatar"
        ></up-avatar>

        <!-- 用户名+手机号 -->
        <view class="user-info-content">
          <view class="user-name">{{ userStore.isLogin ? userInfo.username : '未登录' }}</view>
          <view class="user-phone">{{ userStore.isLogin ? userInfo.nickname : '--------' }}</view>
        </view>

        <!-- 登录入口 -->
        <up-button
            v-if="!userStore.isLogin"
            type="primary"
            size="mini"
            @click="handleLogin"
        >
          立即登录
        </up-button>
      </view>
    </view>

    <!-- 退出登录按钮 (仅登录状态显示) -->
    <view v-if="userStore.isLogin" class="logout-btn-wrap">
      <up-button
          type="primary"
          size="large"
          @click="confirmLogout"
      >
        退出登录
      </up-button>
    </view>
  </view>
</template>

<script setup lang="ts">
import { computed } from 'vue'
import { useUserStore } from '@/pinia/user'
import {  showModal, onShow } from '@dcloudio/uni-app'
// 初始化Pinia仓库
const userStore = useUserStore()

// 计算属性获取用户信息（响应式）
const userInfo = computed(() => userStore.userInfo.user || {})

/**
 * 处理登录跳转
 */
const handleLogin = () => {
  uni.navigateTo({
    url: '/pages/login/index'
  })
}

/**
 * 确认退出登录（带二次确认）
 */
const confirmLogout = async () => {
  console.log('13213')
  try {
    console.log('434')
    const res = await uni.showModal({
      title: '提示',
      content: '确定要退出登录吗？',
      confirmText: '退出',
      cancelText: '取消'
    })

    if (res.confirm) {
      await userStore.logout()
      uni.showToast({ title: '退出登录成功', type: 'success' })
    }
  } catch (error) {
    console.error('退出登录失败：', error)
    uni.showToast({ title: '退出登录失败，请重试', type: 'error' })
  }
}

// 页面显示时检查登录状态
onShow(() => {
  userStore.checkLogin()
})
</script>

<script lang="ts">
export default {
  name: 'UserCenter',
  options: {
    navigationBarTitleText: '个人中心'
  }
}
</script>

<style lang="scss" scoped>
.user-center-page {
  min-height: 100vh;
  background-color: #f5f7fa;
}

// 顶部用户信息栏
.user-info-header {
  position: relative;
  padding-bottom: 40rpx;

  .header-bg {
    position: absolute;
    top: 0;
    left: 0;
    width: 100%;
    height: 320rpx;
    background: linear-gradient(135deg, #409eff, #67c23a);
    border-radius: 0 0 20rpx 20rpx;
    z-index: 1;
  }

  .user-info-wrap {
    position: relative;
    z-index: 2;
    display: flex;
    align-items: center;
    padding: 60rpx 30rpx 0;

    .user-avatar {
      border: 4rpx solid #ffffff;
      box-shadow: 0 2rpx 10rpx rgba(0, 0, 0, 0.1);
      transition: transform 0.2s ease;
      &:active {
        transform: scale(0.95);
      }
    }

    .user-info-content {
      margin-left: 30rpx;
      flex: 1;

      .user-name {
        font-size: 32rpx;
        font-weight: 600;
        color: #ffffff;
        margin-bottom: 10rpx;
        text-shadow: 0 1rpx 3rpx rgba(0, 0, 0, 0.1);
      }

      .user-phone {
        font-size: 26rpx;
        color: rgba(255, 255, 255, 0.9);
      }
    }
  }
}

// 退出登录按钮
.logout-btn-wrap {
  margin: 200rpx 20rpx 20rpx;
}
</style>